<template>
  <div class="decision-page-2">
    <div class="query mg-b-8">
      <div class="query-items">
        <div class="query-item">
          <div class="lable">场站：</div>
          <div class="search-input">
            <el-select
              v-model="value1"
              @change="ChangZhanChange(value1)"
              multiple
              placeholder="请选择"
              popper-class="select"
            >
              <el-option
                v-for="item in ChangZhan"
                :key="item.id"
                :value="item.id"
                :label="item.name"
              >
              </el-option>
            </el-select>
          </div>
        </div>
        <div class="query-item">
          <div class="lable">项目：</div>
          <div class="search-input">
            <el-select
              v-model="value2"
              @change="XiangMuChange(value2)"
              multiple
              placeholder="请选择"
              popper-class="select"
            >
              <el-option
                v-for="item in XiangMu"
                :key="item.id"
                :value="item.id"
                :label="item.name"
              >
              </el-option>
            </el-select>
          </div>
        </div>
        <div class="query-item">
          <div class="lable">线路：</div>
          <div class="search-input">
            <el-select
              v-model="value3"
              @change="XianLuChange(value3)"
              multiple
              placeholder="请选择"
              popper-class="select"
            >
              <el-option
                v-for="item in XianLu"
                :key="item.id"
                :label="item.name"
                :value="item.id"
              >
              </el-option>
            </el-select>
          </div>
        </div>
        <div class="query-item">
          <div class="lable">开始日期：</div>
          <div class="search-input">
            <el-date-picker
              v-model="value4"
              @change="BeginChange(value4)"
              type="date"
              value-format="YYYY-MM-DD"
              placeholder="选择日期"
              popper-class="date-select"
            >
            </el-date-picker>
          </div>
        </div>
        <div class="query-item">
          <div class="lable">结束日期：</div>
          <div class="search-input">
            <el-date-picker
              v-model="value5"
              @change="EndChange(value5)"
              type="date"
              value-format="YYYY-MM-DD"
              placeholder="选择日期"
              popper-class="date-select"
            >
            </el-date-picker>
            <div class="unit svg-icon svg-icon-gray">
              <svg-icon :svgid="''" />
            </div>
          </div>
        </div>
      </div>
      <div class="query-actions">
        <button class="btn green">搜索</button>
        <button class="btn" @click="dbfx">对标分析</button>
        <button class="btn">导出</button>
        <button class="btn" v-show="detailShow == 2" @click="back">返回</button>
      </div>
    </div>

    <div v-show="detailShow == 1">
      <toolbar-panel title="风机绩效榜" :showLine="false"></toolbar-panel>
      <div class="mg-b-16">
        <div class="project-table">
          <Table
            :data="tableData"
            :canScroll="false"
            ref="curRef"
            @onSort="onSort"
          ></Table>
        </div>
      </div>
      <el-row class="mg-b-16">
        <el-col :span="8">
          <panel title="发电量占比">
            <dual-pie-chart
              height="21.296vh"
              :innerData="innerFdl"
              :outerData="outerFdl"
            />
          </panel>
        </el-col>
        <el-col :span="8">
          <panel title="各场站损失电量占比">
            <dual-pie-chart
              height="21.296vh"
              :innerData="innerCz"
              :outerData="outerCz"
            />
          </panel>
        </el-col>
        <el-col :span="8">
          <panel title="理论发电量占比">
            <dual-pie-chart
              height="21.296vh"
              :innerData="innerLl"
              :outerData="outerLl"
            />
          </panel>
        </el-col>
      </el-row>
      <div>
        <panel title="损失电量分析">
          <multiple-bar-chart
            :height="'calc(100vh - 21.5vh - 500px)'"
            :list="analyis"
            :customerTooltip="true"
            @tooltip="tooltip"
            :units="['(万KWh)']"
          />
        </panel>
      </div>
    </div>
    <el-row :type="'flex'" class="content" v-show="detailShow == 2">
      <el-col :span="24" class="pd-l-8">
        <panel :title="'风机对标列表明细'" :showLine="false">
          <div class="project-table">
            <Table
              :data="tableDataDetail"
              ref="curRef"
              @onSort="onSort"
            ></Table>
          </div>
        </panel>
      </el-col>
    </el-row>
    <el-dialog
      title="对标排名分析"
      v-model="dialogVisible"
      width="70%"
      top="10vh"
      custom-class="modal"
      :close-on-click-modal="false"
    >
      <dayinfo
        :radarValue="radarValue"
		:title="[windNum,windNum2]"
        :windNum="windNum"
        :windNum2="windNum2"
        :tabs="tabs"
        :analyisDialog="analyisDialog"
      />
    </el-dialog>
  </div>
</template>

<script>
import MultipleBarChart from "../../components/chart/bar/multiple-bar-chart.vue";
import DualPieChart from "../../components/chart/pie/dual-pie-chart.vue";
import SvgIcon from "../../components/coms/icon/svg-icon.vue";
import Panel from "../../components/coms/panel/panel.vue";
import Table from "./table.vue";
import ToolbarPanel from "../../components/coms/panel/toolbar-panel.vue";
import Dayinfo from "./dayinfo.vue";
import api from "@api/economic/index.js";
export default {
  components: {
    Panel,
    Table,
    SvgIcon,
    DualPieChart,
    MultipleBarChart,
    Dayinfo,
    ToolbarPanel,
  },
  data() {
    let that = this;
    return {
      tableIdArr: [], //放checkbox的id数组
      tableId: [],
      checkLength: 0, //对标分析只能选择2个
      tableData: {
        column: [
          {
            name: "",
            field: "index",
            is_num: false,
            is_light: false,
          },
          {
            name: "",
            field: "check",
            is_num: false,
            is_light: false,
            template: () => {
              return "<input class='check curCheckBox' type='CheckBox' />";
            },
            click: function(event, data) {
              var dataId = that.tableIdArr[data.index - 1];
              if (event.target.checked == false && that.checkLength <= 2) {
                that.tableId.forEach((item, i) => {
                  if (item == dataId) {
                    that.tableId.splice(i, 1);
                    that.dbData.splice(i, 1);
                  }
                });
                that.checkLength--;
              } else if (event.target.checked && that.checkLength < 2) {
                that.tableId.push(dataId);
                that.dbData.push(data);
                that.checkLength++;
              } else if (that.checkLength == 2) {
                event.target.checked = false;
              }
            },
          },
          {
            name: "名称",
            field: "name",
            is_num: false,
            is_light: false,
          },
          {
            name: "综合排名",
            field: "zhpm",
            is_num: false,
            is_light: false,
            sortable: true,
          },
          {
            name: "发电量排名",
            field: "fdlpm",
            is_num: false,
            is_light: false,
            sortable: true,
          },
          {
            name: "发电量",
            field: "fdl",
            is_num: false,
            is_light: false,
            sortable: true,
          },
          {
            name: "故障损失排名",
            field: "gzssdlpm",
            is_num: false,
            is_light: false,
            sortable: true,
          },
          {
            name: "故障损失",
            field: "gzssdl",
            is_num: false,
            is_light: false,
            sortable: true,
          },
          {
            name: "检修损失排名",
            field: "jxssdlpm",
            is_num: false,
            is_light: false,
            sortable: true,
          },
          {
            name: "检修损失",
            field: "jxssdl",
            is_num: false,
            is_light: false,
            sortable: true,
          },
          {
            name: "性能损失排名",
            field: "xnssdlpm",
            is_num: false,
            is_light: false,
            sortable: true,
          },
          {
            name: "性能损失",
            field: "xnssdl",
            is_num: false,
            is_light: false,
            sortable: true,
          },
          {
            name: "限电损失排名",
            field: "xdssdlpm",
            is_num: false,
            is_light: false,
            sortable: true,
          },
          {
            name: "限电损失",
            field: "xdssdl",
            is_num: false,
            is_light: false,
            sortable: true,
          },
          {
            name: "受累损失排名",
            field: "slssdlpm",
            is_num: false,
            is_light: false,
            sortable: true,
          },
          {
            name: "受累损失",
            field: "slssdl",
            is_num: false,
            is_light: false,
            sortable: true,
          },
          {
            name: "风能利用率排名",
            field: "fnlylpm",
            is_num: false,
            is_light: false,
            sortable: true,
          },
          {
            name: "风能利用率(%)",
            field: "fnlyl",
            is_num: false,
            is_light: false,
            sortable: true,
          },
          {
            name: "故障损失率排名",
            field: "gzsslpm",
            is_num: false,
            is_light: false,
            sortable: true,
          },
          {
            name: "故障损失率(%)",
            field: "gzssl",
            is_num: false,
            is_light: false,
            sortable: true,
          },
          {
            name: "检修损失率排名",
            field: "jxsslpm",
            is_num: false,
            is_light: false,
            sortable: true,
          },
          {
            name: "检修损失率(%)",
            field: "jxssl",
            is_num: false,
            is_light: false,
            sortable: true,
          },
          {
            name: "弃风率排名",
            field: "qflpm",
            is_num: false,
            is_light: false,
            sortable: true,
          },
          {
            name: "弃风率(%)",
            field: "qfl",
            is_num: false,
            is_light: false,
            sortable: true,
          },
          {
            name: "性能损失率排名",
            field: "xnsslpm",
            is_num: false,
            is_light: false,
            sortable: true,
          },
          {
            name: "性能损失率(%)",
            field: "xnssl",
            is_num: false,
            is_light: false,
            sortable: true,
          },
          {
            name: "受累损失率排名",
            field: "slsslpm",
            is_num: false,
            is_light: false,
            sortable: true,
          },
          {
            name: "受累损失率(%)",
            field: "slssl",
            is_num: false,
            is_light: false,
            sortable: true,
          },
          {
            name: "操作",
            field: "cz",
            is_num: false,
            is_light: false,
            template: function() {
              return "<a class='action'>详情</a>";
            },
            click: function(event, data) {
              var dataId = that.tableIdArr[data.index - 1];
              that.clearDb();
              that.detailShow = 2;
              // var that = this;

              api.benchmarkingDetails({
                  id: dataId,
                  beginDate: that.value4,
                  endDate: that.value5,
                  target: "",
                  sort: "",
              }).then((res) => {
             var dataTab = [];
                  res.data.forEach((item, index) => {
                    that.tableIdArr.push(item.id);

                    console.log(this,that)
                    dataTab.push({
                      //表格
                      index: index + 1,
                      fdl: item.fdl,
                      name: item.name,
                      zhpm: item.zhpm,
                      gzssdl: item.gzssdl,
                      jxssdlpm: item.jxssdlpm,
                      jxssdl: item.jxssdl,
                      xnssdlpm: item.xnssdlpm,
                      xnssdl: item.xnssdl,
                      xdssdlpm: item.xdssdlpm,
                      xdssdl: item.xdssdl,
                      slssdlpm: item.slssdlpm,
                      slssdl: item.slssdl,
                      fnlylpm: item.fnlylpm,
                      fnlyl: item.fnlyl,
                      gzsslpm: item.gzsslpm,
                      gzssl: item.gzssl,
                      jxsslpm: item.jxsslpm,
                      jxssl: item.jxssl,
                      qflpm: item.qflpm,
                      qfl: item.qfl,
                      xnsslpm: item.xnsslpm,
                      xnssl: item.xnssl,
                      slsslpm: item.slsslpm,
                      slssl: item.slssl,
                      is_light: false,
                    });
                  });
                  that.tableDataDetail.data = dataTab;
              });

              // that.API.requestData({
              //   method: "GET",
              //   baseURL: "http://10.83.66.220:8020/",
              //   subUrl: "benchmarking/details",
              //   data: {
              //     id: dataId,
              //     beginDate: that.value4,
              //     endDate: that.value5,
              //     target: "",
              //     sort: "",
              //   },
              //   success(res) {
              //     var dataTab = [];
              //     res.data.forEach((item, index) => {
              //       that.tableIdArr.push(item.id);

              //       dataTab.push({
              //         //表格
              //         index: index + 1,
              //         fdl: item.fdl,
              //         name: item.name,
              //         zhpm: item.zhpm,
              //         gzssdl: item.gzssdl,
              //         jxssdlpm: item.jxssdlpm,
              //         jxssdl: item.jxssdl,
              //         xnssdlpm: item.xnssdlpm,
              //         xnssdl: item.xnssdl,
              //         xdssdlpm: item.xdssdlpm,
              //         xdssdl: item.xdssdl,
              //         slssdlpm: item.slssdlpm,
              //         slssdl: item.slssdl,
              //         fnlylpm: item.fnlylpm,
              //         fnlyl: item.fnlyl,
              //         gzsslpm: item.gzsslpm,
              //         gzssl: item.gzssl,
              //         jxsslpm: item.jxsslpm,
              //         jxssl: item.jxssl,
              //         qflpm: item.qflpm,
              //         qfl: item.qfl,
              //         xnsslpm: item.xnsslpm,
              //         xnssl: item.xnssl,
              //         slsslpm: item.slsslpm,
              //         slssl: item.slssl,
              //         is_light: false,
              //       });
              //     });
              //     that.tableDataDetail.data = dataTab;
              //   },
              // });
            },
          },
        ],
        data: [],
      },
      tableDataDetail: {
        column: [
          {
            name: "",
            field: "index",
            is_num: false,
            is_light: false,
          },
          {
            // name: "",
            name: "发电量",
            field: "fdl",
            is_num: false,
            is_light: false,
            display: "none",
          },
          {
            name: "",
            field: "check",
            is_num: false,
            is_light: false,
            template: function() {
              return "<input class='check curCheckBox checkItem' type='CheckBox'/>";
            },
            click: function(event, data) {
              var dataId = that.tableIdArr[data.index - 1];
              if (event.target.checked == false && that.checkLength <= 2) {
                that.tableId.forEach((item, i) => {
                  if (item == dataId) {
                    that.tableId.splice(i, 1);
                    that.dbData.splice(i, 1);
                  }
                });
                that.checkLength--;
              } else if (event.target.checked && that.checkLength < 2) {
                that.tableId.push(dataId);
                that.dbData.push(data);
                that.checkLength++;
              } else if (that.checkLength == 2) {
                event.target.checked = false;
              }
            },
          },
          {
            name: "风机名称",
            field: "name",
            is_num: false,
            is_light: false,
          },
          {
            name: "综合排名",
            field: "zhpm",
            is_num: false,
            is_light: false,
            sortable: true,
          },
          {
            name: "故障损失",
            field: "gzssdl",
            is_num: false,
            is_light: false,
            sortable: true,
          },
          {
            name: "检修损失排名",
            field: "jxssdlpm",
            is_num: false,
            is_light: false,
            sortable: true,
          },
          {
            name: "检修损失",
            field: "jxssdl",
            is_num: false,
            is_light: false,
            sortable: true,
          },
          {
            name: "性能损失排名",
            field: "xnssdlpm",
            is_num: false,
            is_light: false,
            sortable: true,
          },
          {
            name: "性能损失",
            field: "xnssdl",
            is_num: false,
            is_light: false,
            sortable: true,
          },
          {
            name: "限电损失排名",
            field: "xdssdlpm",
            is_num: false,
            is_light: false,
            sortable: true,
          },
          {
            name: "限电损失",
            field: "xdssdl",
            is_num: false,
            is_light: false,
            sortable: true,
          },
          {
            name: "受累损失排名",
            field: "slssdlpm",
            is_num: false,
            is_light: false,
            sortable: true,
          },
          {
            name: "受累损失",
            field: "slssdl",
            is_num: false,
            is_light: false,
            sortable: true,
          },
          {
            name: "故障损失率排名",
            field: "gzsslpm",
            is_num: false,
            is_light: false,
            sortable: true,
          },
          {
            name: "故障损失率(%)",
            field: "gzssl",
            is_num: false,
            is_light: false,
            sortable: true,
          },
          {
            name: "检修损失率排名",
            field: "jxsslpm",
            is_num: false,
            is_light: false,
            sortable: true,
          },
          {
            name: "检修损失率(%)",
            field: "jxssl",
            is_num: false,
            is_light: false,
            sortable: true,
          },
          {
            name: "弃风率排名",
            field: "qflpm",
            is_num: false,
            is_light: false,
            sortable: true,
          },
          {
            name: "弃风率(%)",
            field: "qfl",
            is_num: false,
            is_light: false,
            sortable: true,
          },
          {
            name: "性能损失率排名",
            field: "xnsslpm",
            is_num: false,
            is_light: false,
            sortable: true,
          },
          {
            name: "性能损失率(%)",
            field: "xnssl",
            is_num: false,
            is_light: false,
            sortable: true,
          },
          {
            name: "受累损失率排名",
            field: "slsslpm",
            is_num: false,
            is_light: false,
            sortable: true,
          },
          {
            name: "受累损失率(%)",
            field: "slssl",
            is_num: false,
            is_light: false,
            sortable: true,
          },
        ],
        data: [],
      },
      options: [],
      ChangZhan: [], //场站
      XiangMu: [], //项目
      XianLu: [], //线路
      value1: [],
      value2: [],
      value3: [],
      value4: "",
      value5: "",
      innerFdl: [], //发电量占比
      outerFdl: [],
      innerCz: [], //各场站损失电量占比
      outerCz: [],
      innerLl: [], //理论发电量占比
      outerLl: [],
      analyis: [], //损失电量分析
      dialogVisible: false,
      radarValue: [],
      windNum: "dd",
      windNum2: "dd",
      tabs: [],
      analyisDialog: [],
      detailShow: 1,
      ajaxData: [],
      dbData: [],
    };
  },
  created() {
    this.ChangZhanVal();
    // this.XiangMuVal()
    this.value4 = this.getTime(1);
    this.value5 = this.getTime(2);
    this.AjaxCommon();
  },
  methods: {
    ChangZhanVal() {

      api.benchmarkingWplist2({
      }).then((res) => {
         //   that.value2.push(res.data[0].id);
          this.ChangZhan = res.data;
          //  that.AjaxCommon();
          this.XiangMuVal(this.value2);
          console.log("resCHANzhan:", res.data);
          console.log("value2:", this.value2);
      });

      // var that = this;
      // that.API.requestData({
      //   method: "GET",
      //   baseURL: "http://10.83.66.220:8020/",
      //   subUrl: "benchmarking/wplist",
      //   success(res) {
      //   //   that.value2.push(res.data[0].id);
      //     that.ChangZhan = res.data;
      //     //  that.AjaxCommon();
      //     that.XiangMuVal(that.value2);
      //     console.log("resCHANzhan:", res.data);
      //     console.log("value2:", that.value2);
      //   },
      // });
    },
    ChangZhanChange(val) {
      this.value1 = val;
      this.value2 = [];
    //   this.value2 = val;
      this.value3 = [];
      this.AjaxCommon();
      this.XiangMuVal(val);
      this.clearDb();
    },
    XiangMuVal(val) {

 api.benchmarkingProjectList({
        wpids: val,
      }).then((res) => {
       this.XiangMu = res.data;
      });

      // var that = this;
      // that.API.requestData({
      //   method: "GET",
      //   baseURL: "http://10.83.66.220:8020/",
      //   subUrl: "benchmarking/projectList",
      //   data: {
      //     wpids: val,
      //   },
      //   success(res) {
      //     that.XiangMu = res.data;
      //     console.log("Xiangmu:", res.data);
      //   },
      // });
    },
    XiangMuChange(val) {
      this.value2 = val;
      this.value3 = [];
      this.AjaxCommon();
    //   this.XiangMuVal(val);
      this.XianLuVal(val);
      this.clearDb();
    },
    XianLuVal(val) {

      api.benchmarkingLineList2({
         projects: val,
      }).then((res) => {
        this.XianLu = res.data;
      });

      // var that = this;
      // that.API.requestData({
      //   method: "GET",
      //   baseURL: "http://10.83.66.220:8020/",
      //   subUrl: "benchmarking/lineList",
      //   data: {
      //     projects: val,
      //   },
      //   success(res) {
      //     that.XianLu = res.data;
      //   },
      // });
    },
    XianLuChange(val) {
      this.value3 = val;
      this.AjaxCommon();
      this.clearDb();
    },
    BeginChange(val) {
      this.value4 = val;
      this.AjaxCommon();
      this.clearDb();
    },
    EndChange(val) {
      this.value5 = val;
      this.AjaxCommon();
      this.clearDb();
    },
    getTime(val) {
      //时间戳处理，val=1是默认开始时间（当前月第一天），val=2是默认结束时间（今天）
      var date = new Date();
      var year = date.getFullYear(),
        month = date.getMonth() + 1,
        day = date.getDate();
      month >= 1 && month <= 9 ? (month = "0" + month) : "";
      day >= 0 && day <= 9 ? (day = "0" + day) : "";
      var begin = year + "-" + month + "-01";
      var end = year + "-" + month + "-" + day;
      if (val == 1) {
        return begin;
      } else if (val == 2) {
        return end;
      }
    },
    AjaxCommon() {

      api.benchmarkingWxssl({
         wpids: this.value1,
          projectids: this.value2,
          lineids: this.value3,
          beginDate: this.value4,
          endDate: this.value5,
          target: "",
          sort: "",
      }).then((res) => {
         this.ajaxData = res.data;
          console.log("resData:", res);
          var dataTab = [], //表格
            fdl = [],
            cz = [],
            ll = [],
            analyis = [],
            gzssdl = [],
            jxssdl = [],
            xnssdl = [],
            xdssdl = [],
            slssdl = [];
          res.data.forEach((item, index) => {
            this.tableIdArr.push(item.id);
            dataTab.push({
              //表格
              index: index + 1,
              name: item.name,
              zhpm: item.zhpm,
              fdlpm: item.fdlpm,
              fdl: item.fdl,
              gzssdlpm: item.gzssdlpm,
              gzssdl: item.gzssdl,
              jxssdlpm: item.jxssdlpm,
              jxssdl: item.jxssdl,
              xnssdlpm: item.xnssdlpm,
              xnssdl: item.xnssdl,
              xdssdlpm: item.xdssdlpm,
              xdssdl: item.xdssdl,
              slssdlpm: item.slssdlpm,
              slssdl: item.slssdl,
              fnlylpm: item.fnlylpm,
              fnlyl: item.fnlyl,
              gzsslpm: item.gzsslpm,
              gzssl: item.gzssl,
              jxsslpm: item.jxsslpm,
              jxssl: item.jxssl,
              qflpm: item.qflpm,
              qfl: item.qfl,
              xnsslpm: item.xnsslpm,
              xnssl: item.xnssl,
              slsslpm: item.slsslpm,
              slssl: item.slssl,
              is_light: false,
            });

            fdl.push({
              value: item.fdl,
              name: item.name,
            });

            cz.push({
              value: (
                item.gzssdl +
                item.jxssdl +
                item.xnssdl +
                item.xdssdl +
                item.slssdl
              ).toFixed(2),
              name: item.name,
            });

            ll.push({
              value: item.llfdl,
              name: item.name,
            });

            gzssdl.push({
              text: item.name,
              value: item.gzssdl,
            });
            jxssdl.push({
              text: item.name,
              value: item.jxssdl,
            });
            xnssdl.push({
              text: item.name,
              value: item.xnssdl,
            });
            xdssdl.push({
              text: item.name,
              value: item.xdssdl,
            });
            slssdl.push({
              text: item.name,
              value: item.slssdl,
            });
          });
          analyis.push(
            {
              title: "故障损失电量",
              yAxisIndex: 0,
              value: gzssdl,
            },
            {
              title: "检修损失电量",
              yAxisIndex: 0,
              value: jxssdl,
            },
            {
              title: "性能损失电量",
              yAxisIndex: 0,
              value: xnssdl,
            },
            {
              title: "限电损失电量",
              yAxisIndex: 0,
              value: xdssdl,
            },
            {
              title: "受累损失电量",
              yAxisIndex: 0,
              value: slssdl,
            }
          );
          this.tableData.data = dataTab;
          this.innerFdl = fdl;
          this.outerFdl = fdl;

          this.innerCz = cz;
          this.outerCz = cz;

          this.innerLl = ll;
          this.outerLl = ll;

          this.analyis = analyis;
      });

      // var that = this;
      // that.API.requestData({
      //   //五项损失率
      //   method: "GET",
      //   baseURL: "http://10.83.66.220:8020/",
      //   subUrl: "benchmarking/wxssl",
      //   data: {
      //     wpids: that.value1,
      //     projectids: that.value2,
      //     lineids: that.value3,
      //     beginDate: that.value4,
      //     endDate: that.value5,
      //     target: "",
      //     sort: "",
      //   },
      //   success(res) {
      //     that.ajaxData = res.data;
      //     console.log("resData:", res);
      //     var dataTab = [], //表格
      //       fdl = [],
      //       cz = [],
      //       ll = [],
      //       analyis = [],
      //       gzssdl = [],
      //       jxssdl = [],
      //       xnssdl = [],
      //       xdssdl = [],
      //       slssdl = [];
      //     res.data.forEach((item, index) => {
      //       that.tableIdArr.push(item.id);
      //       dataTab.push({
      //         //表格
      //         index: index + 1,
      //         name: item.name,
      //         zhpm: item.zhpm,
      //         fdlpm: item.fdlpm,
      //         fdl: item.fdl,
      //         gzssdlpm: item.gzssdlpm,
      //         gzssdl: item.gzssdl,
      //         jxssdlpm: item.jxssdlpm,
      //         jxssdl: item.jxssdl,
      //         xnssdlpm: item.xnssdlpm,
      //         xnssdl: item.xnssdl,
      //         xdssdlpm: item.xdssdlpm,
      //         xdssdl: item.xdssdl,
      //         slssdlpm: item.slssdlpm,
      //         slssdl: item.slssdl,
      //         fnlylpm: item.fnlylpm,
      //         fnlyl: item.fnlyl,
      //         gzsslpm: item.gzsslpm,
      //         gzssl: item.gzssl,
      //         jxsslpm: item.jxsslpm,
      //         jxssl: item.jxssl,
      //         qflpm: item.qflpm,
      //         qfl: item.qfl,
      //         xnsslpm: item.xnsslpm,
      //         xnssl: item.xnssl,
      //         slsslpm: item.slsslpm,
      //         slssl: item.slssl,
      //         is_light: false,
      //       });

      //       fdl.push({
      //         value: item.fdl,
      //         name: item.name,
      //       });

      //       cz.push({
      //         value: (
      //           item.gzssdl +
      //           item.jxssdl +
      //           item.xnssdl +
      //           item.xdssdl +
      //           item.slssdl
      //         ).toFixed(2),
      //         name: item.name,
      //       });

      //       ll.push({
      //         value: item.llfdl,
      //         name: item.name,
      //       });

      //       gzssdl.push({
      //         text: item.name,
      //         value: item.gzssdl,
      //       });
      //       jxssdl.push({
      //         text: item.name,
      //         value: item.jxssdl,
      //       });
      //       xnssdl.push({
      //         text: item.name,
      //         value: item.xnssdl,
      //       });
      //       xdssdl.push({
      //         text: item.name,
      //         value: item.xdssdl,
      //       });
      //       slssdl.push({
      //         text: item.name,
      //         value: item.slssdl,
      //       });
      //     });
      //     analyis.push(
      //       {
      //         title: "故障损失电量",
      //         yAxisIndex: 0,
      //         value: gzssdl,
      //       },
      //       {
      //         title: "检修损失电量",
      //         yAxisIndex: 0,
      //         value: jxssdl,
      //       },
      //       {
      //         title: "性能损失电量",
      //         yAxisIndex: 0,
      //         value: xnssdl,
      //       },
      //       {
      //         title: "限电损失电量",
      //         yAxisIndex: 0,
      //         value: xdssdl,
      //       },
      //       {
      //         title: "受累损失电量",
      //         yAxisIndex: 0,
      //         value: slssdl,
      //       }
      //     );
      //     that.tableData.data = dataTab;
      //     that.innerFdl = fdl;
      //     that.outerFdl = fdl;

      //     that.innerCz = cz;
      //     that.outerCz = cz;

      //     that.innerLl = ll;
      //     that.outerLl = ll;

      //     that.analyis = analyis;
      //   },
      // });
    },
    AjaxDbfx() {
      var that = this;
      var data = that.dbData;
      that.windNum = data[0].name;
      that.windNum2 = data[1].name;
      that.tabs = [
        {
          name: "发电量",
          windData1: data[0].fdl,
          windData2: data[1].fdl,
        },
        {
          name: "故障损失电量",
          windData1: data[0].gzssdl,
          windData2: data[1].gzssdl,
        },
        {
          name: "检修损失电量",
          windData1: data[0].jxssdl,
          windData2: data[1].jxssdl,
        },
        {
          name: "性能未达标损失电量",
          windData1: data[0].xnssdl,
          windData2: data[1].xnssdl,
        },
        {
          name: "受累损失电量",
          windData1: data[0].slssdl,
          windData2: data[1].slssdl,
        },
        {
          name: "风能利用率",
          windData1: data[0].fnlyl,
          windData2: data[1].fnlyl,
        },
        {
          name: "故障损失率",
          windData1: data[0].gzssl,
          windData2: data[1].gzssl,
        },
        {
          name: "检修损失率",
          windData1: data[0].jxssl,
          windData2: data[1].jxssl,
        },
        {
          name: "弃风率",
          windData1: data[0].qfl,
          windData2: data[1].qfl,
        },
        {
          name: "性能损失率",
          windData1: data[0].xnssl,
          windData2: data[1].xnssl,
        },
        {
          name: "受累损失率",
          windData1: data[0].slssl,
          windData2: data[1].slssl,
        },
      ];

      that.radarValue = [
        {
          indicator: [
            "风能利用率",
            "故障损失率",
            "检修损失率",
            "弃风率",
            "性能损失率",
            "受累损失率",
          ],
          data: [
            {
              value: [
                data[0].fnlylpm,
                data[0].gzsslpm,
                data[0].jxsslpm,
                data[0].qflpm,
                data[0].xnsslpm,
                data[0].slsslpm,
              ],
            },
            {
              value: [
                data[1].fnlylpm,
                data[1].gzsslpm,
                data[1].jxsslpm,
                data[1].qflpm,
                data[1].xnsslpm,
                data[1].slsslpm,
              ],
            },
          ],
        },
      ];

      var analyis = [],
        gzssdl = [],
        jxssdl = [],
        xnssdl = [],
        xdssdl = [],
        slssdl = [];
      data.forEach((item, index) => {
        gzssdl.push({
          text: item.name,
          value: item.gzssdl,
        });
        jxssdl.push({
          text: item.name,
          value: item.jxssdl,
        });
        xnssdl.push({
          text: item.name,
          value: item.xnssdl,
        });
        xdssdl.push({
          text: item.name,
          value: item.xdssdl,
        });
        slssdl.push({
          text: item.name,
          value: item.slssdl,
        });
      });
      analyis.push(
        {
          title: "故障损失电量",
          yAxisIndex: 0,
          value: gzssdl,
        },
        {
          title: "检修损失电量",
          yAxisIndex: 0,
          value: jxssdl,
        },
        {
          title: "性能损失电量",
          yAxisIndex: 0,
          value: xnssdl,
        },
        {
          title: "限电损失电量",
          yAxisIndex: 0,
          value: xdssdl,
        },
        {
          title: "受累损失电量",
          yAxisIndex: 0,
          value: slssdl,
        }
      );
      that.analyisDialog = analyis;
    },
    tooltip(param, callback) {
      var color = ["#05bb4c", "#4b55ae", "#fa8c16", "#f8de5b"];

      var result = param[0].axisValue;
      param.forEach((value, index) => {
        result +=
          "<br />" +
          `<span style="display:inline-block;margin-right:4px;border-radius:10px;width:10px;height:10px;background-color:${color[index]};"></span>` +
          value.seriesName +
          "：" +
          value.value;
      });
      callback(result);
      return true;
    },
    dbfx() {
      var that = this;
      if (that.tableId.length == 2) {
        that.dialogVisible = true;
        this.AjaxDbfx();
        this.clearDb();
      }
    },
    clearDb() {
      //清空对标状态
      this.$refs.curRef.clearCheckBox();
      this.tableId = [];
      this.dbData = [];
      this.checkLength = 0;
    },
    back() {
      this.detailShow = 1;
      this.clearDb();
    },
    onSort() {
      this.clearDb();
    },
  },
};
</script>

<style lang="less">
.decision-page-2 {
  .content .project-table {
    tbody {
      height: calc(100vh - 24.5vh);
    }
  }

  .project-table {
    overflow: auto;

    tbody {
      height: 145px;
    }

    th,
    td {
      color: #b2bdc0;

      &:nth-child(1) {
        width: 50px;
      }

      &:nth-child(2) {
        width: 50px;
      }
    }
  }

  .action {
    text-decoration: underline;
    color: @green;
    cursor: pointer;
  }
}
</style>
